(a) P{OS

(b) OI{OS

(c) KF{OS

Figure 2.

(a) OS80{OS15 (b) OS80{OS40

(c) OS80{OS60 (d) OS80{OS120

Figure 4.

(a) NCEP OI{OS40 (b) NCEP OI{OS60

(c) NCEP OI{OS80 (d) NCEP OI{OS120

(a) OS{GOSTA (b) OS{Smith et al

(c) OS{NCEP OI (d) NCEP OI{Smith et al

(e) Large-scale estimated error (f) Small-scale estimated error

(a) NCEP OI{OS (b) NCEP OI{OS Full Atlantic Full Atlantic{area withheld

(c) NCEP OI{OS (d) NCEP OI{OS The globe The globe{area withheld

Figure 8.

(a) NCEP OI: May 1988 (b) Smith et al: May 1988

(c) OS: May 1988 (d) OSn: May 1988

Figure 10.

Figure 11.

Figure 12.

Figure 13.

Figure 14.