1860 1880 1900 1920 1940 1960 1980

-1

-0.8

-0.6

-0.4

-0.2

0

0.2

0.4

0.6

0.8

[0.4*NA+0.6*NP]-GT; thin line and dots: OS and obs ann mns, thick line and circles: 5 yrs rnnng mns