100

2 1

-20 -20 -14.4

0

-212.2040

-7.2

-7.2

0

-212.20

000

-7.2

178.56

00

555555555555 0

10 file: l1x1.002

-20 -20 -14.4

000

-7.2

-7.2

00

0 -7.2

00

270

-7.2

178.56

0

0

555555555 0